2619171513111210869754321

N.B. On early versions this line

BIAS

BIASRETURN

VCCAGND

AGNDSENSE

VCCSENSE

VDD SENSE

DGNDSENSE

VDDDGND

SELECT

RESET

ILEDX

ILED

PINBIAS

TEMPK4 support card power kapton cable
for the temperature is not connected
looking from above
connector
support card
looking from above
connector
module

36.91mm

63.68mm