0 20 40 60 80 100 120 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 Noise chip 0

0 20 40 60 80 100 120 0

0.5

1

1.5

2

2.5 Noise chip 1

0 20 40 60 80 100 120 0

0.5

1

1.5

2

2.5

Noise chip 2

0 20 40 60 80 100 120 0 0.5 1 1.5 2 2.5 3 3.5

Noise chip 3

0 20 40 60 80 100 120 0

0.5

1

1.5

2

2.5 Noise chip 4

0 20 40 60 80 100 120 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 Noise chip 5

0 20 40 60 80 100 120 0

0.5

1

1.5

2

2.5

3

Noise chip 6

0 20 40 60 80 100 120 0

0.5

1

1.5

2

2.5

3 Noise chip 7