strip area and voltage.

Large area strips with significant
relative to the module ground ref.

very sensitive to voltages on these
capacitance to nearby conductors so

CpVnINPUT LOOP - ELECTRIC
to frequency proximity

N.B. coupling proportional

AMPSHAP

COMP

+-