PSSignal QCDscaleScaleSignal VVVQCDscale WWQCDscale WZQCDscale ZZ4lQCDscale ZjetsQCDscale ggZZPSCKKW ggZZQCDscale ggZZQCDscaleNorm qqZZ4LEWcorr qqZZEWcorr qqZZPSCKIN qqZZPSCKKW qqZZPSQSF qqZZQCDscale topInterference topME ttbarME ttbarPS ttbarQCDscale

2− 1.5 − 1− 0.5 − 0 0.5 1 1.5

Pull