\begin{titlepage}

\memohead
\rightline{\vbox{
  \hbox{\bf StdHep 5.06.01}
  \hbox{\bf PM0091}
}}

\vspace{2.0in}
\begin{center}
  {\LARGE\bf  StdHep \\ 5.06.01 \\}
  {\Large\bf  Monte Carlo Standardization at FNAL \\}
  {\Large\bf  Fortran and C Implementation \\}
  {\Large\bf  Lynn Garren \\}
  {\Large\bf  November 20, 2006 \\}
\end{center}
\vspace{2.0in}
\begin{center}
  {\large\bf  mc-users@fnal.gov \\}
  {\large\bf  http://cepa.fnal.gov/psm/stdhep/ \\}
\end{center}

\end{titlepage}

\vspace{0.5in}
\centerline{ Copyright (c) 1991   Universities Research Association, Inc. }
\centerline{   All Rights Reserved }
\vspace{0.2in}
\centerline{ DISCLAIMER }

The software is licensed on an "as is" basis only.  Universities Research
Association, Inc. (URA) makes no representations or warranties, express
or implied.  By way of example but not of limitation, URA makes no
representations or WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY
PARTICULAR PURPOSE, that  the use of the licensed software will not
infringe any patent, copyright, or trademark, or as to the use (or the
results of the use) of the licensed  software or written material in
terms of correctness, accuracy, reliability, currentness or otherwise.
The entire risk as to the results and performance of the  licensed
software is assumed by the user.  Universities Research Association, Inc.
and any of its trustees, overseers, directors, officers, employees,
agents or contractors shall not be liable under any claim, charge, or
demand, whether in contract, tort, criminal law, or otherwise, for any
and all loss, cost, charge, claim, demand, fee, expense, or damage of
every nature and kind arising out of, connected with, resulting from or
sustained as a result of using this software. In no event shall URA be
liable for special, direct, indirect or consequential damages, losses,
costs, charges, claims, demands, fees or expenses of any  nature or kind.
 
This material resulted from work developed under a Government Contract
and is subject to the following license:  The Government retains a
paid-up, nonexclusive, irrevocable worldwide license to reproduce,
prepare derivative works, perform publicly and display publicly by or for
the Government,  including the right to distribute to other Government
contractors.  Neither the United States nor the United States Department
of Energy, nor any of their employees, makes any warranty, express or
implied, or assumes any legal liability or responsibility for the
accuracy, completeness, or usefulness of any  information, apparatus,
product, or process disclosed, or represents that its use would not
infringe privately owned rights.
 
For futher information about this program, contact Lynn Garren,
Fermi National Accelerator Laboratory (FNAL), (630) 840-2061,
garren@fnal.gov.  The StdHep home page is http://cepa.fnal.gov/psm/stdhep/.

\newpage

\setcounter{page}{1}
\tableofcontents

\cleardoublepage
