(mm) 0z 300 − 200− 100− 0 100 200 300

Entries

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

0.022

0.024

of selected truth (in mm)

0z_{truthz0}

Entries 3727 Mean 0.7962 Std Dev 78.81

truthz0

truthz0

0z