θ 0 0.5 1 1.5 2 2.5 3

Entries

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

of selected truth θ truththeta Entries 3727 Mean 1.592 Std Dev 1.13 truththeta

truththeta

θ