(mm)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

Entries

0

5

10

15

20

25

30

35 Radial distance (r) of truth vtx parameter from origin

truthprodR Entries 3727 Mean 1.15 Std Dev 0.4793