(mm) 0d 2− 1.5− 1− 0.5− 0 0.5 1 1.5 2

Entries

0

10

20

30

40

50 of selected truth (in mm)

0d_{truthd0}

Entries 3727 Mean 0.01122 Std Dev 0.581 0d