2.5 − 2− 1.5− 1− 0.5− 0 0.5 1 1.5 2 2.5

0.01

0.012

0.014

0.016

0.018

0.02

0.022

η ) vs tru)θ

*sin( 0 - z rec)θ

*sin(

0(zσ):θ

*sin( 0 Resolution width z_{reswidth_z0*sin(theta)_vs_eta}

Entries 20 Mean 0.01791 − Std Dev 1.6

η 0 0 Resolution width z