2.5 − 2− 1.5− 1− 0.5− 0 0.5 1 1.5 2 2.5

0.002

0.003

0.004

0.005

0.006

0.007

0.008

0.009 η ) vs tru - (q/p) rec ((q/p) σ Resolution width q/pt: _{reswidth_qopt_vs_eta}

Entries 20 Mean 0.03336 Std Dev 1.731

η σ Resolution width q/pt: