0.5 − 0 0.5 1 1.5 2 0

0.001

0.002

0.003

0.004

0.005

)_T

) vs log(p truϕ - recϕ(σ:ϕ Resolution width _{reswidth_phi_vs_logpt}

Entries 10 Mean 0.2605 Std Dev 0.3701

Resolution width