2.5 − 2− 1.5− 1− 0.5− 0 0.5 1 1.5 2 2.5 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 3−10 × η ) vs truϕ - recϕ(σ:ϕ Resolution width _{reswidth_phi_vs_eta}

Entries 20 Mean 0.0179 − Std Dev 1.799 η Resolution width