2.5 − 2− 1.5− 1− 0.5− 0 0.5 1 1.5 2 2.5

0.016 − 0.014 − 0.012 − 0.01 − 0.008 − 0.006 − 0.004 − 0.002 − 0 0.002 η ) vs 0 tru - d 0 rec : (d 0 Resolution mean d_{resmean_d0_vs_eta}

Entries 20 Mean 0.1623 − Std Dev 1.237 η 0 0 0 Resolution mean d