2.5 − 2− 1.5− 1− 0.5− 0 0.5 1 1.5 2 2.5

0.044

0.046

0.048

0.05

0.052

0.054

0.056

0.058

0.06

0.062 η vs ϕσ)/^{tru}ϕ - recϕ: (ϕ

Pull width _{pullwidth_phi_vs_eta}

Entries 20 Mean 0.01363 − Std Dev 1.412

pullwidth_phi_vs_eta

pullwidth_phi_vs_eta

η Pull width