2.5 − 2− 1.5− 1− 0.5− 0 0.5 1 1.5 2 2.5

0.48 0.5 0.52

0.54

0.56

0.58 0.6 0.62

0.64

0.66

0.68 η vs ϕσ)/^{tru}ϕ - recϕ: (ϕ

Pull width _{pullwidth_phi_vs_eta}

Entries 20 Mean 0.01363 − Std Dev 1.412 η Pull width