(mm) 0d 300 − 200− 100− 0 100 200 300

Entries

0

0.2

0.4

0.6

0.8

1 eff_d0_Numerator Entries 0 Mean 0 Std Dev 0

of reco-matched truth track (in mm) 0d

eff_d0_Numerator

eff_d0_Numerator