truth Transverse Momentum [GeV]

0 20 40 60 80 100 120 140 160 180 200 efficiency

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

Efficiency

Tp_{Eff_pt}

Entries 18264 Mean 51.89 Std Dev 27.71

Eff_pt Eff_pt

Tp