truth Azimuthal Angle

3− 2− 1− 0 1 2 3 efficiency

0

0.002

0.004

0.006

0.008

0.01

0.012

Phi Efficiency

Eff_phi Entries 18264 Mean 0.02398 Std Dev 1.798

Eff_phi Eff_phi