η 4− 3− 2− 1− 0 1 2 3 4

<Cluster Efficiency>

0

0.2

0.4

0.6

0.8

1 Cluster Effiency of B-Layer_{BLayer_Efficiency}

Entries 0 Mean 0 Std Dev 0

Cluster Effiency of B-Layer