(GeV) γ T cut value E

0 20 40 60 80 100 120 140 160 180 200

Signal prediction

10^{-4}

10^{-3}

10^{-2}

10^{-1}

1

10

10^2

)^2

) (GeV/c γ cut value m(l,l,

50 100 150 200 250 300 350 400

Signal prediction

10^{-2}

10^{-1}

1

10

10^2