jet_Et_1st

Entries 6907043 Mean 40.46 RMS 24.05 Underflow 0 Overflow 8.692e+05 Integral 6.038e+06

0 10 20 30 40 50 60 70 80 90 100 0 500 1000

1500

2000

2500

3000

3500 2 x10 jet Et, 1st