CprWeight

Entries 5896 Mean 11.18 RMS 7.534 Underflow 0 Overflow 0 Integral 1045

0 10 20 30 40 50 60 70 80 90 100

-150

-100 -50 0 50 100 150 200 250 300 CprWeight