0 2000 4000 6000 8000 10000

1

10

210

Mass = 0.0794 GeV, Coupling = 5.0e-06_{Pz_M}

Entries 10000 Mean 1038 Std Dev 694.7

Mass = 0.0794 GeV, Coupling = 5.0e-06