pull

-2

0

2

4

ZDPhi_J2_ZbORc

ZDPhi_J2_Zl

ZMbb_ZbORc

ZPtV

ZPtV_Zl

ZMjj

ZMlljj

0.74 ± 0.28 -

0.65 ± 0.66 -

0.99 ± 0.02 -

0.99 ± 0.09 -

0.25 ± 0.21

0.88 ± 0.40

0.75 ± 0.24 -

0.74 ± 0.00

0.65 ± 0.00

0.99 ± 0.00 -

0.98 ± 0.00

0.24 ± 0.00 -

0.88 ± 0.00 -

0.74 ± 0.00

0.74 ± 0.00 -

0.65 ± 0.00 -

0.99 ± 0.00 -

0.98 ± 0.00 -

0.24 ± 0.00 -

0.88 ± 0.00

0.75 ± 0.00 -