pull

-2

0

2

4

ElecE

ElecEResol

ElecEffic

MuonEResolID

MuonEResolMS

MuonEffic

1.10 ± 0.19

0.82 ± 0.12

0.99 ± 0.02 -

0.85 ± 0.13

1.09 ± 0.03

0.99 ± 0.01 -

0.94 ± 0.00 -

0.97 ± 0.00

0.99 ± 0.00 -

0.99 ± 0.00 -

0.99 ± 0.00 -

0.99 ± 0.00 -

0.94 ± 0.00

0.99 ± 0.00

0.99 ± 0.00 -

0.99 ± 0.00 -

0.99 ± 0.00 -

0.99 ± 0.00