0 2000 4000 6000 8000 10000 [GeV] 0p

10

210

310

410 P_M

0 0.005 0.01 0.015 0.02 [rad] θ 0 2000

4000

6000

8000

10000

12000

14000

16000

Theta_M

0 0.5 1 [GeV] 0m 0

10000

20000

30000

40000

50000

Mass_M

0 0.10.20.30.40.50.60.70.80.9 1 [GeV] 0 T p

310

Pt_M

3− 2− 1− 0 1 2 3 [rad] ϕ 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

Phi_M

0

1000

2000

3000

4000

5000

6000

ThetaVsP_M

6−10^{5−}10^{4−}10^{3−}10^{2−}10^{1−}10 1 [rad] θ 1

10

210

310

410

510

[GeV] 0p