pull

4−

2−

0

2

4

norm_Norm_bbH norm_Norm_ggH LUMI METSoftTrkResoPara METSoftTrkScale FakeNorm_ehad FakeNorm_muhad FakeShape_ehad FakeShape_muhad Fakebtag JETNP1 TAUID TAUIDHIGHPT TAURECO TES TESAF2 eFakes xsec_Z

1.38 ± 1.00

796.08 ± 0.00

0.32 ± 0.00 -

0.36 ± 0.00 -

0.23 ± 0.00 -

0.29 ± 0.00 -

0.44 ± 0.00

0.40 ± 0.00

0.23 ± 0.00 -

0.47 ± 0.00 -

0.47 ± 0.00

0.12 ± 0.00 -

0.68 ± 0.00 -

0.26 ± 0.00

0.19 ± 0.00

0.68 ± 0.00 -

0.14 ± 0.00

0.19 ± 0.00

6.29 ± 0.00

153.66 ± 2.37

0.91 ± 0.36 -

0.88 ± 0.39

0.72 ± 0.82 -

0.68 ± 1.48 -

0.70 ± 0.37 -

1.27 ± 0.26

0.42 ± 0.52 -

0.77 ± 0.06 -

1.21 ± 0.09

0.71 ± 0.66

0.99 ± 0.00

0.93 ± 0.57

0.65 ± 0.72 -

0.99 ± 0.00 -

0.36 ± 0.06

0.88 ± 0.63