pull

4−

2−

0

2

4

norm_Norm_bbH

norm_Norm_ggH

FakeNorm_ehad

FakeNorm_muhad

1.38 ± 1.00

796.08 ± 0.00

0.32 ± 0.00 -

0.36 ± 0.00 -

6.29 ± 0.00

153.66 ± 2.37

0.91 ± 0.36 -

0.88 ± 0.39