pull

4−

2−

0

2

4

METSoftTrkResoPara

METSoftTrkResoPerp

METSoftTrkScale

0.47 ± 0.00 -

0.52 ± 0.00

0.47 ± 0.00

0.77 ± 0.06 -

1.02 ± 0.40

1.21 ± 0.09