pull

4−

2−

0

2

4

norm_Norm_bbH

norm_Norm_ggH

FakeNorm_ehad

FakeNorm_muhad

1.02 ± 0.98

2.97 ± 0.08

0.91 ± 0.01 -

0.88 ± 0.00 -

32.84 ± 0.00

594.77 ± 192.31

0.90 ± 0.30 -

0.87 ± 0.44