pull

4−

2−

0

2

4

METSoftTrkResoPara

METSoftTrkResoPerp

METSoftTrkScale

0.94 ± 0.00

0.96 ± 0.00

0.98 ± 0.01 -

0.75 ± 0.12 -

1.09 ± 0.11

1.16 ± 0.06 -