pull

4−

2−

0

2

4

norm_Norm_bbH

norm_Norm_ggH

LUMI

FakeShape_ehad

FakeShape_muhad

TAUID

TAUIDHIGHPT

TAURECO

TAURECOHIGHPT TES TESAF2

eFakes

xsec_Z

1.74 ± 1.29

1.83 ± 0.01

0.70 ± 0.02 -

0.67 ± 0.00 -

0.39 ± 0.00 -

0.70 ± 0.00

0.99 ± 0.01

0.93 ± 0.00 -

0.99 ± 0.00

0.75 ± 0.00

0.99 ± 0.00

0.39 ± 0.01

0.88 ± 0.00

0.00 ± 1.48

122.22 ± 0.97

3.21 ± 0.84 -

3.11 ± 1.51 -

3.24 ± 0.54 -

3.23 ± 0.65

3.26 ± 0.00 -

3.24 ± 0.54

3.26 ± 0.00 -

3.23 ± 0.72 -

3.26 ± 0.00 -

3.26 ± 0.06

3.23 ± 0.69