pull

4−

2−

0

2

4

METSoftTrkResoPara

METSoftTrkResoPerp

METSoftTrkScale

0.93 ± 0.00

0.95 ± 0.00

0.97 ± 0.00 -

3.26 ± 0.06 -

3.25 ± 0.41

3.26 ± 0.08