4− 2− 0 2 4

alpha_ATLAS_JETNP2 alpha_ATLAS_JERNP1 alpha_ATLAS_Top_Shape alpha_ATLAS_xsec_Diboson alpha_ATLAS_JETNP1 alpha_ATLAS_METSoftTrkResoPerp alpha_ATLAS_TAUID alpha_ATLAS_xsec_Top alpha_ATLAS_METSoftTrkScale alpha_ATLAS_METSoftTrkResoPara alpha_ATLAS_xsec_Z alpha_ATLAS_FakeNorm_muhad alpha_ATLAS_LUMI alpha_ATLAS_FakeShape_muhad alpha_ATLAS_eFakes

μΔ 0.1 − 0.05− 0 0.05 0.1

4− 3− 2− 1− 0 1 2 3 4

θΔ)/_0θ -θ

Pull: ( Normalisation μ Postfit Impact on σ+1 μ Postfit Impact on σ-1 μ Prefit Impact on σ1± ATLAS Internal^{-1}

= 13 TeV, 3.34 fb s =300 GeV Hm