pull

4−

2−

0

2

4

METSoftTrkResoPara

METSoftTrkResoPerp

METSoftTrkScale

0.98 ± 0.00 -

0.99 ± 0.00 -

0.98 ± 0.00

0.98 ± 0.00 -

0.99 ± 0.00

0.98 ± 0.00 -