500 600 700 800 900 1000 1100 1200 1300 1

10

210

310

410 MHZZReWeight

= 0.6 (0.1%) Γ = 27.8 (3.1%) Γ = 50.3 (5.6%) Γ = 68.4 (7.6%) Γ = 88.9 (9.9%) Γ = 103.5 (11.5%) Γ = 115.8 (12.9%) Γ = 126.7 (14.1%) Γ = 137.6 (15.3%) Γ = 140.2 (15.6%) Γ = 147.3 (16.4%) Γ