400 500 600 700 800 900 1000 1

10

210

310

410 MHZZReWeight

= 0.6 (0.1%) Γ = 13.6 (1.9%) Γ = 23.0 (3.3%) Γ = 33.8 (4.8%) Γ = 45.4 (6.5%) Γ = 55.4 (7.9%) Γ = 64.7 (9.2%) Γ = 74.6 (10.7%) Γ = 81.6 (11.7%) Γ = 84.6 (12.1%) Γ = 87.3 (12.5%) Γ