300 400 500 600 700 1

10

210

310

410 MHZZReWeight

= 0.6 (0.1%) Γ = 4.5 (0.9%) Γ = 7.9 (1.6%) Γ = 11.8 (2.4%) Γ = 15.5 (3.1%) Γ = 18.4 (3.7%) Γ = 20.6 (4.1%) Γ = 23.9 (4.8%) Γ = 26.0 (5.2%) Γ = 30.0 (6.0%) Γ = 28.6 (5.7%) Γ