200 250 300 350 400 450 500 550 600 1

10

210

310

410 MHZZReWeight

= 0.6 (0.1%) Γ = 1.9 (0.5%) Γ = 3.8 (1.0%) Γ = 4.9 (1.2%) Γ = 6.4 (1.6%) Γ = 7.8 (1.9%) Γ = 8.9 (2.2%) Γ = 10.4 (2.6%) Γ = 11.6 (2.9%) Γ = 12.9 (3.2%) Γ = 13.4 (3.4%) Γ