)α-β cos(

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 β tan

-1 10

1

10 β

1 β

1 β

1 β

1 β

1 β

1 1

ATLAS Internal = 8 TeV s -1 L dt = 20.3 fb ∫ =440 GeV Type II H llqq m → ZZ →H → gg Exp 95% CL limit (5% smear) bandσ1± Exp 95% CL limit bandσ2± Excluded