0 0.2 0.4 0.6 0.8 1 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

HighMassFragFunction(HighMassFragFunction)

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0.5

1

1.5

2

2.5

3

Delphi X

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

Opal X

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

0.5

1

1.5

2

2.5

3

Aleph X

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.5 1 1.5 2 2.5 3 3.5 Sld X

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 100 200 300 400 500 600 700 800 900 3 10× Comapre X