[GeV] Xm 300 400 500 600 700 800 900 1000

[pb] hh →X x BR Xσ 95% CL Limit on

1−10

1

10

Limits for lephad

run 1 H (scaled) 70% (G, 10 fb-1) 77% (G, 10 fb-1) 85% (G, 10 fb-1)