Deviation in microns

-0.01 -0.008 -0.006 -0.004 -0.002 -0 0.002 0.004 0.006 0.008 0.01

Population

0 5 10 15 20 25 30 35 40 Nent = 0

Nent = 0 Constant = 31.12 +- 5.064 Mean = 0.002408 +- 0.0001608 Sigma = 0.001172 +- 0.0001442

Horizontal tension = 200g Compression = 15g

Distribution of Data_{Nent = 0}