20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01

20 40 60 0 0.002

0.004

0.006

0.008

0.01