0

0.05

0.1

0.15

0.2

0.25 x 10^{-2}

0 50 100 150 200 250 300 350 400

0 10 20 30 40 50 60 70 80 90 100

0 100 200 300 400

z conversion position /cm

1/N_{event} dn/dz

1994 Data CDM

1994 Data

z/cm r/cm

CDM

z/cm r/cm

0 10 20 30 40 50 60 70 80 90 100

0 100 200 300 400