r280226.histos

2001/03/21 19.21

Old Planar test pulse hit map

r280226.histos

New Planar test pulse hit map

0

5

10

15

20

25

30

35

0 5 10 15 20 25 30

0 5 10 15 20 25 30 35 40

0 5 10 15 20 25