0 50 100 150 200 250

1.4 1.5 1.6 1.7 1.8 1.9 2 2.1 2.2 2.3

Kπ mass /GeV

No. combinations

Upgraded FT Current FT

m_{kππ}-m_{kπ} /GeV

No. combinations

0 10 20 30 40 50 60 70 80

0.14 0.145 0.15 0.155 0.16 0.165 0.17 0.175 0.18