Vertex Efficiency for Charged Current Events

0

0.2

0.4

0.6

0.8

1

-2 -1.8 -1.6 -1.4 -1.2 -1 -0.8 -0.6 -0.4 -0.2 0

Central or Forward vertex Central vertex

log10(y_{had})

Vertex Efficiency