Lp 2.1 3 4 5 6 7 8 10 20

10 ^{-4}

10 ^{-3}

10 ^{-2}

10 ^{-1}

1 10 10 ^2

gd _{total} gp _{total}

gg _{total}

�

�

Center of mass energy (GeV)

C ro s s ec tio n (m b)

Laboratory beam momentum (GeV/c) gp gd 0.3 1 10 100 1000 10000

0.1 1 10 100 1000 10000